Roland JV-1080/XP-50 System
---------------------------

* System 
  - loads the current system settings


* Match the JV-1080 Unit number
  to the "Comm Ch" in the driver list
  - press the System button
  - press the DOWN button
  - until SYS-EXC page is displayed
  - Ensure Unit# matches the Comm Ch
  - Ensure Rx.Exc is ON

* Match the XP-50 Unit number
  to the "Comm Ch" in the driver list
  - press the SYSTEM button
  - press the MIDI button (Button 4)
  - press the UP or DOWN arrows
  - until "Unit #" is displayed
  - Ensure Unit# matches the Comm Ch
  - Ensure Rx.Exc is ON

* Note: the JV-1080 and XP-50 do not
  provide SysX codes to load the ROM
  banks into the computer. Patches
  must be loaded singly.

* Note: the XP-50 can not tranmit its
  sequence data via a SysX dump. This
  data must be saved to disk.

